Dotmatcher: fasta::syc_ecoli.fasta:SYC_ECOLI vs fasta::s...

(windowsize = 10, threshold = 23.00 20/03/09)

SYC_ECOLI

SYC_HALSA

050100150200250300350400450050 100150200250300350400450