Dotmatcher: fasta::clpb_ecoli.fasta:CLPB_ECOLI vs fasta:...

(windowsize = 10, threshold = 23.00 20/03/09)

CLPB_ECOLI

CLPL_LACLA

01002003004005006007008000 100200300400500600700